      * SERVEXT.DEF - definitions for the C$SERVER-EXTENSION library routine.
      * Last modified: 10-May-2006

      * Copyright (c) 1996-2014 by Micro Focus.  Users of ACUCOBOL
      * may freely include this file in their COBOL source code.

      * C$SERVER-EXTENSION opcodes

       78  CSE-CLEAR-QUEUE             VALUE 1.
       78  CSE-QUEUE                   VALUE 2.
       78  CSE-SEND                    VALUE 3.
       78  CSE-SEND-STATUS             VALUE 4.
       78  CSE-WAIT-FOR-INPUT          VALUE 5.
       78  CSE-RECEIVE                 VALUE 6.
       78  CSE-CLEANUP                 VALUE 7.

      * C$SERVER-EXTENSION error codes

       78  CSE-SUCCESS                 VALUE 0.
       78  CSE-E-TIMEDOUT              VALUE -1.
       78  CSE-E-NOMEMORY              VALUE -2.
       78  CSE-E-OVERFLOW              VALUE -3.
       78  CSE-E-SENDFAILED            VALUE -4.
       78  CSE-E-RECVFAILED            VALUE -5.
       78  CSE-E-SOCKET                VALUE -6.
       78  CSE-E-DEADCLIENT            VALUE -7.

      * End of SERVEXT.DEF.
